MW OB-I

W_λ [A^o ]

He II 5412 0.1 0.10.1

0.2 0.2 0.3 0.30.20.10.0 0.4 0.5 0.50.60.70.80.80.70.40.40.20.70.4

0.60.6 1.0 1.1 1.0 0.9 0.80.71.21.31.3 1.2 0.91.00.9 1.2 1.2 1.4 1.3 1.41.4

1.1 1.31.5 1.2 0.4 1.2

1.51.5

0.4 1.6 1.3 1.01.01.01.1 1.5 1.6 1.1 1.3 1.11.11.2

0.81.21.41.21.3 0.1 1.5

1.11.31.2 1.5 1.6

2.0 2.2 2.4 2.6 2.8 3.0 3.2 3.4 3.6 3.8 4.0 4.2 4.4

4.1 4.2 4.3 4.4 4.5 4.6 4.7 4.8

log (T* / K) log g [cgs]