WC SMC

4.60

4.55

4.65

4.70

4.75

4.80

4.85

4.90

4.95

5.00

5.05

5.10

4.60 5.15

5.20

4.60

5.15

-0.8

-0.6

-0.4

-0.2 0.0 0.2 0.4 0.6 0.8 1.0 1.2 1.4 1.6

4.6 4.7 4.8 4.9 5.0 5.1 5.2 5.3 log (T* / K) log (R_t / R )